From aefc374317860aa1e7fd1ed305cbf71b3ce132a8 Mon Sep 17 00:00:00 2001
From: Badlop <badlop@process-one.net>
Date: Thu, 5 Aug 2021 13:52:38 +0200
Subject: Fix typo when creating index (thanks to Millesimus)

Reference: https://github.com/processone/ejabberd/commit/95fa43aa96514b7e8b77fa7c29d2c0b5b1c1331a#r54157330
---
 sql/mysql.new.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'sql/mysql.new.sql')

diff --git a/sql/mysql.new.sql b/sql/mysql.new.sql
index c6d74bb91..01aeffbc5 100644
--- a/sql/mysql.new.sql
+++ b/sql/mysql.new.sql
@@ -86,7 +86,7 @@ CREATE TABLE sr_user (
     PRIMARY KEY (server_host(191), jid, grp)
 ) ENGINE=InnoDB CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
 
-CREATE UNIQUE INDEX i_sr_user_sh_jid_group ON sr_group(server_host(191), jid, grp);
+CREATE UNIQUE INDEX i_sr_user_sh_jid_group ON sr_user(server_host(191), jid, grp);
 CREATE INDEX i_sr_user_sh_jid ON sr_user(server_host(191), jid);
 CREATE INDEX i_sr_user_sh_grp ON sr_user(server_host(191), grp);
 
-- 
cgit v1.2.3

