From e000cbb03437932b0fb25ee24a1396871c23e2d9 Mon Sep 17 00:00:00 2001
From: Badlop <badlop@process-one.net>
Date: Tue, 27 Nov 2007 14:45:30 +0000
Subject: * doc/guide.tex: Added clarification about LDAP default port (thanks
 to Christophe Romain).

SVN Revision: 991
---
 doc/guide.tex | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'doc/guide.tex')

diff --git a/doc/guide.tex b/doc/guide.tex
index f9a7a65b3..6d8d82930 100644
--- a/doc/guide.tex
+++ b/doc/guide.tex
@@ -1504,7 +1504,11 @@ Parameters:
 \titem{ldap\_server} \ind{options!ldap\_server}IP address or dns name of your
 LDAP server. This option is required.
 \titem{ldap\_port} \ind{options!ldap\_port}Port to connect to your LDAP server.
-  The default value is~389.
+  The initial default value is~389, so it is used when nothing is set into the 
+configuration file. 
+If you configure a value, it is stored in ejabberd's database. 
+Then, if you remove that value from the configuration file, 
+the value previously stored in the database will be used instead of the default 389.
 \titem{ldap\_rootdn} \ind{options!ldap\_rootdn}Bind DN. The default value
   is~\term{""} which means `anonymous connection'.
 \titem{ldap\_password} \ind{options!ldap\_password}Bind password. The default
-- 
cgit v1.2.3

