From c100cbedd1137da62bfcc3859d289fd068f15af7 Mon Sep 17 00:00:00 2001
From: Badlop <badlop@process-one.net>
Date: Fri, 2 Jul 2010 13:08:33 +0200
Subject: Document the mod_muc option captcha_protected

---
 doc/guide.tex | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'doc/guide.tex')

diff --git a/doc/guide.tex b/doc/guide.tex
index 272f933b4..ac5fc5527 100644
--- a/doc/guide.tex
+++ b/doc/guide.tex
@@ -3201,6 +3201,10 @@ Module options:
   \titem{\{anonymous, true|false\}} The room is anonymous:
   occupants don't see the real JIDs of other occupants.
   Note that the room moderators can always see the real JIDs of the occupants.
+  \titem{\{captcha\_protected, false\}} 
+  When a user tries to join a room where he has no affiliation (not owner, admin or member),
+  the room requires him to fill a CAPTCHA challenge (see section \ref{captcha})
+  in order to accept her join in the room.
   \titem{\{logging, false|true\}} The public messages are logged using \term{mod\_muc\_log}.
   \titem{\{max\_users, 200\}} Maximum number of occupants in the room.
   \titem{\{members\_by\_default, true|false\}} The occupants that enter the room are participants by default, so they have 'voice'.
-- 
cgit v1.2.3

