From c6589845311e2a628c6f663a3e75050cd9f81015 Mon Sep 17 00:00:00 2001
From: Holger Weiss <holger@zedat.fu-berlin.de>
Date: Tue, 26 Aug 2014 01:01:11 +0200
Subject: Fix an XEP reference in the guide

---
 doc/guide.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/guide.tex')

diff --git a/doc/guide.tex b/doc/guide.tex
index 17f164a78..69cc900f7 100644
--- a/doc/guide.tex
+++ b/doc/guide.tex
@@ -1062,7 +1062,7 @@ request_handlers:
     You can define a certificate file for a specific domain using the global option \option{domain\_certfile}.
   \titem{stream\_management: true|false}
     Setting this option to \term{false} disables ejabberd's support for
-    \ind{protocols!XEP-0198: Stream Management}. It can be specified for
+    Stream Management (\xepref{0198}). It can be specified for
     \term{ejabberd\_c2s} listeners. The default value is \term{true}.
   \titem{timeout: Integer} \ind{options!timeout}
     Timeout of the connections, expressed in milliseconds.
-- 
cgit v1.2.3

