From 24323e8b3b136608b21c277e681c3e5bb5b2c1ce Mon Sep 17 00:00:00 2001
From: Badlop <badlop@process-one.net>
Date: Wed, 4 Nov 2009 20:12:54 +0000
Subject: Extend explanation of ldap_encrypt tls (thanks to Konstantin
 Khomoutov)

SVN Revision: 2723
---
 doc/guide.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'doc/guide.tex')

diff --git a/doc/guide.tex b/doc/guide.tex
index 57a754548..61ae46547 100644
--- a/doc/guide.tex
+++ b/doc/guide.tex
@@ -2163,7 +2163,8 @@ Parameters:
 LDAP servers. This option is required.
 \titem{\{ldap\_encrypt, none|tls\}} \ind{options!ldap\_encrypt}Type of connection encryption to the LDAP server.
 Allowed values are: \term{none}, \term{tls}.
-Note that STARTTLS is not supported.
+The value \term{tls} enables encryption by using LDAP over SSL.
+Note that STARTTLS encryption is not supported.
 The default value is: \term{none}.
 \titem{\{ldap\_port, Number\}} \ind{options!ldap\_port}Port to connect to your LDAP server.
 The default port is~389 if encryption is disabled; and 636 if encryption is enabled.
-- 
cgit v1.2.3

