--- man/snmpd.8.def.orig	Wed Feb 26 04:11:19 2003
+++ man/snmpd.8.def	Sat Mar 29 22:05:07 2003
@@ -211,6 +211,10 @@
 the error "Error opening specified endpoint".  Likewise, since AAL5
 PVC support is only currently available on Linux, it will fail with
 the same error on other platforms.
+.PP
+.B snmpd
+uses libwrap's access control if configured by --with-libwrap.
+Access control patterns may only reference IP addresses.
 
 .RE
 .SH CONFIGURATION FILES
