--- man/snmpd.1.def.orig	Tue May  7 06:28:37 2002
+++ man/snmpd.1.def	Thu Jul 25 18:49:40 2002
@@ -205,6 +205,10 @@
 the error "Error opening specified endpoint".  Likewise, since AAL5
 PVC support is only currently available on Linux, it will fail with
 the same error on other platforms.
+.PP
+.B snmpd
+uses libwrap's access control if configured by --with-libwrap.
+Access control patterns may only reference IP addresses.
 
 .RE
 .SH CONFIGURATION FILES
